Buy Alprazolam Powder Online

Buy Alprazolam Powder Online

Buy Alprazolam Powder Online and all other pharmaceutical and research chemical products sold on this website are intended for research and forensic applications. Alprazolam has the molecular formula C17H13ClN4 and the formula weight has the value 308.765 g/mol.

Please read the latest safety informations through once you have received the product with the IUPAC name 8-Chloro-1-methyl-6-phenyl-4H-[1,2,4]triazolo[4,3-a][1,4]benzodiazepine.

It is recommended to store Alprazolam in a cool and dry place. The anabolic steroid Testosterone enanthate can be stored for up to two years under recommended storage conditions.

What you will receive when you buy Alprazolam from COOL CHEM STORE?

One sealed aluminum foil bag containing highest grade Alprazolam

Verified quality product

≥ 98% Purity

The post Buy Alprazolam Powder Online appeared first on COOL CHEM STORE.