Buy 4-Aco-DMT Online

Buy 4-Aco-DMT Online

Buy 4-ACO-DMT online, O-Acetylpsilocin is a synthetically produced psychoactive drug and has been suggested by David Nichols to be a potentially useful alternative to psilocybin for pharmacological studies, as they are both believed to be prodrugs of psilocin.

4-ACO-DMT (also known as O-Acetylpsilocin, 4-Acetoxy-DMT, or Psilacetin) is a synthetically produced psychedelic tryptamine. It is the acetylated form of the psilocybin mushroom alkaloid psilocin and is a lower homolog of 4-AcO-DET, 4-AcO-MiPT and 4-AcO-DiPT. The compound has been suggested by David Nichols to be a potentially useful alternative to psilocybin for pharmacological studies as they are both believed to be prodrugs of psilocin. Its structural similarities to psilocin and psilocybin results in an identical subjective effect profile and the three compounds can be said to feel indistinguishable from each other. This allows 4-AcO-DMT to function as a perfect substitute for psilocybin mushrooms.

This product is intended for forensic and research applications.
This product is intended to be used as an analytical reference standard
Bulk material is available for academic research at qualified institutions; please contact our sales department for pricing.

The post Buy 4-Aco-DMT Online appeared first on COOL CHEM STORE.